HTTP/1.1 200 OK Server: Microsoft-IIS/10.0 X-Powered-By: ezEIP X-Frame-Options: SAMEORIGIN Date: Mon, 17 Nov 2025 10:45:19 GMT Connection: close Content-Length: 0